From 673b44e5fa3d8616b96dbc03fbab73e40789a650 Mon Sep 17 00:00:00 2001
From: tradke <tradke@1c20744c-e24a-42ec-9533-f5004cb800e5>
Date: Mon, 17 Feb 2003 16:46:04 +0000
Subject: Mention the range of possible timelevel values for the
 input_array_time_levels array in the options table.

git-svn-id: http://svn.cactuscode.org/arrangements/CactusPUGH/PUGHInterp/trunk@51 1c20744c-e24a-42ec-9533-f5004cb800e5
---
 doc/documentation.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'doc/documentation.tex')

diff --git a/doc/documentation.tex b/doc/documentation.tex
index dbc29e8..d314402 100644
--- a/doc/documentation.tex
+++ b/doc/documentation.tex
@@ -149,7 +149,8 @@ of \InterpGridArrays\ is:
   CCTK_INT input_array_time_levels[N_input_arrays];
 \end{verbatim}
 which lets you choose the timelevels for the individual grid arrays to
-interpolate. If no such table option is given, then the current timelevel (0)
+interpolate (in the range $[0, N\_time\_levels\-\_of\_var\_i - 1]$).
+If no such table option is given, then the current timelevel (0)
 will be taken as the default.
 
 The following table options are meant for the user to specify how the
-- 
cgit v1.2.3

