\documentclass{article}

% Use the Cactus ThornGuide style file
% (Automatically used from Cactus distribution, if you have a 
%  thorn without the Cactus Flesh download this from the Cactus
%  homepage at www.cactuscode.org)
\usepackage{../../../../doc/ThornGuide/cactus}

\begin{document}

\title{CoordGauge}
\author{Tom Goodale}
\date{$ $Date$ $}

\maketitle

% Do not delete next line
% START CACTUS THORNGUIDE

\begin{abstract}
Base thorn to provide the infrastructure for dynamic gauge selection
\end{abstract}

\section{Purpose}

The {\bf CoordGauge} implementation schedules five groups:

\begin{verbatim}
CoordGauge
LapseSelect IN CoordGauge BEFORE PickCoordGauge
LapseApply  IN CoordGauge AFTER  PickCoordGauge
ShiftSelect IN CoordGauge BEFORE PickCoordGauge
ShiftApply  IN CoordGauge AFTER  PickCoordGauge
\end{verbatim}
%
and one function
\begin{verbatim}
PickCoordGauge IN CoordGauge
\end{verbatim}
%
and has two public grid scalars
\begin{verbatim}
selected_lapse
selected_shift
\end{verbatim}
%
and two string parameters
\begin{verbatim}
lapse_list
shift_list
\end{verbatim}

It also provides four aliased functions
%
\begin{verbatim}
int CoordGauge_RegisterLapse("lapse-name")
int CoordGauge_RegisterShift("shift-name")
CoordGauge_Lapse("lapse-name")
CoordGauge_Shift("shift-name")
\end{verbatim}

(If someone can think of better names, please say so 8-)

Then each thorn which wants to apply a coordinate gauge condition
registers itself, receiving a unique integer as an id, and schedules a
selection routine and an application routine in the appropriate schedule
groups.

The selection routine decides if this gauge condition should be applied at
this time, and calls the \verb|CoordGauge_Lapse/Shift| aliased function.
(It should check that it is actually in the appropriate parameter as a
minimum.)

The \verb|PickCoordGauge| function traverses the list of lapses/shifts
and selects the first one in the list which has called the
\verb|CoordGauge_Lapse/Shift| aliased function and sets the
appropriate grid scalar to the id of this one.

The application routine checks to see if the grid scalar is set to its id,
and if so, applies the gauge condition.

Evolution thorns could schedule {\bf CoordGauge} at the appropriate point or
points in their schedule.

An advantage of this scheme over the current one is that it provides the
selection routines with a full set of variables from which to decide
whether they should apply a guage or not.  So it becomes very easy to
choose to switch off maximal if the lapse has collapsed within a certain
volume, etc.

This is simpler than the previous scheme as there is no arbitrary 'bid'
floating around.  It also allows us to keep the logic of the final
selection in one place, thus allowing people to override this logic if
they need to.

\section{Comments}

% Do not delete next line
% END CACTUS THORNGUIDE
\end{document}
