From c02711b0b292abdb319857a53682e536a7e7bf71 Mon Sep 17 00:00:00 2001
From: tradke <tradke@0337457d-221f-4ee6-a5f0-14255d5370d8>
Date: Mon, 1 Sep 2003 09:03:28 +0000
Subject: Changed the datatype of the PHYSICALMIN/PHYSICALMAX options in
 coordinate tables from REAL to INT.

git-svn-id: http://svn.cactuscode.org/arrangements/CactusBase/CoordBase/trunk@5 0337457d-221f-4ee6-a5f0-14255d5370d8
---
 doc/documentation.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'doc/documentation.tex')

diff --git a/doc/documentation.tex b/doc/documentation.tex
index dac8316..b289d1b 100644
--- a/doc/documentation.tex
+++ b/doc/documentation.tex
@@ -363,9 +363,9 @@ table, which should have the following entries:\beforetable
 SYSTEM        & CCTK\_INT    & \verb|<handle>|\\
 NAME          & CCTK\_STRING & \code{x}\\
 DIRECTION     & CCTK\_INT    & \code{2}\\
-PHYSICALMIN   & CCTK\_REAL   & \code{0.0}\\
+PHYSICALMIN   & CCTK\_INT    & \code{0}\\
 COMPMIN       & CCTK\_REAL   & \\
-PHYSICALMAX   & CCTK\_REAL   & \\
+PHYSICALMAX   & CCTK\_INT    & \\
 COMPMAX       & CCTK\_REAL   & \\
 TYPE          & CCTK\_STRING & \verb/uniform|non-uniform|warped/\\
 TIMEDEPENDENT & CCTK\_INT    & \verb/<yes (1)|no (0)>/\\
-- 
cgit v1.2.3

