From fc1e74f53d987cf01a21139eacebe95940b2a690 Mon Sep 17 00:00:00 2001
From: Thomas Radke <tradke@aei.mpg.de>
Date: Fri, 4 Feb 2005 18:19:00 +0000
Subject: CarpetIOHDF5: document the 'refinement_levels' I/O parameter option

darcs-hash:20050204181953-776a0-786609f50f6b6b1526ceeb94d8aea32bb2dd903b.gz
---
 Carpet/CarpetIOHDF5/doc/documentation.tex | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'Carpet/CarpetIOHDF5/doc/documentation.tex')

diff --git a/Carpet/CarpetIOHDF5/doc/documentation.tex b/Carpet/CarpetIOHDF5/doc/documentation.tex
index 489be7039..b76661e77 100644
--- a/Carpet/CarpetIOHDF5/doc/documentation.tex
+++ b/Carpet/CarpetIOHDF5/doc/documentation.tex
@@ -150,7 +150,10 @@ First, you have to activate the thorn in your Cactus parameter file:
         list of full names of Cactus grid variables to output;
         Each variable name can have an option string attached in which you
         can specify a different output frequency for that individual variable
-        (e.g. {\tt IOHDF5::out\_vars = "wavetoy::phi\{ out\_every = 4 \}"})
+	or a set of individual refinement levels to be output, e.g.
+\begin{verbatim}
+  IOHDF5::out_vars = "wavetoy::phi{ out_every = 4 refinement_levels = { 1 2 } }"
+\end{verbatim}
   \item {\tt IOHDF5::out\_criterion = "$<$keyword choice$>$"}\\
         criterion to select output intervals (overwrites {\tt IO::out\_criterion})
   \item {\tt IOHDF5::out\_every = $<$integer$>$}\\
-- 
cgit v1.2.3

