From f83dead3ca8d91bade7166a6b97ab0e8fbf9f934 Mon Sep 17 00:00:00 2001
From: knarf <knarf@17b73243-c579-4c4c-a9d2-2d5706c11dac>
Date: Mon, 28 Mar 2011 04:03:32 +0000
Subject: fix latex

git-svn-id: http://svn.cactuscode.org/flesh/trunk@4693 17b73243-c579-4c4c-a9d2-2d5706c11dac
---
 doc/UsersGuide/Notes.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/UsersGuide/Notes.tex')

diff --git a/doc/UsersGuide/Notes.tex b/doc/UsersGuide/Notes.tex
index 8085eb32..62038ca3 100644
--- a/doc/UsersGuide/Notes.tex
+++ b/doc/UsersGuide/Notes.tex
@@ -392,7 +392,7 @@ type of optimisation being used.
 Optimisation flags for the Fortran 77 compiler, their use depends on the
 type of optimisation being used.
 
-\item [\texttt{C\_NO_OPTIMISE\_FLAGS}]
+\item [\texttt{C\_NO\_OPTIMISE\_FLAGS}]
 
 \item [\texttt{CXX\_NO\_OPTIMISE\_FLAGS}]
 
-- 
cgit v1.2.3

